
<template>
  <div>
    <basicLayout
      ref="list"
      :oldFormPath="{
        add: 'HDrpManagement/workBillModule/components',
      }"
      tableName="workBillModuleTable"
      idName="sa_workorder_templateid"
      :apiId="{ query: 20230207140603, del: 20230207140803 }"
      :options="options"
      :detailPath="{
        path: '/workBillModuleDetail',
      }"
    >
      <div slot="custom" style="display: flex"></div>
      <template v-slot:tbList="scope">
        <div v-if="scope.data.column.columnname == 'isused'">
          <el-switch
            disabled
            :active-value="1"
            :inactive-value="0"
            v-model="scope.data.column.data.isused"
            size="small"
          ></el-switch>
        </div>
        <div v-else-if="scope.data.column.columnname == 'is_auto_transfer_template'">
          {{ scope.data.column.data.is_auto_transfer_template ? $t("是") : $t("否") }}
        </div>
        <div v-else>
          {{
            scope.data.column.data[[scope.data.column.columnname]]
              ? $t(scope.data.column.data[[scope.data.column.columnname]])
              : "--"
          }}
        </div>
      </template>
      <template v-slot:tbOpreation="scope"> </template>
    </basicLayout>
  </div>
</template>

<script>
export default {
  data() {
    return {
      options: [],
    };
  },
  methods: {},
};
</script>
<style>
</style>